2E-15

1E-15

0-1E-15

-2E-15

06.0

4:41:00.0

54.0

40:48.0

30.0

33:00.0

32:00.0

31:00.0

44:30:00.0

RA (J2000)

Dec (J2000)

OBSID 01150107000 / DATE-OBS 2023-01-21T05:46:51.5

UVOT Finding Chart