05101520257:45:50.0

46.0

42.0

37:00.0

30.0

38:00.0

39:00.0

-4:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00970886000 / DATE-OBS 2020-05-09T06:49:45.6

UVOT Finding Chart