04.0

16:20:00.0

56.0

19:52.0

36:30.0

37:00.0

30.0

-15:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00690738000 / DATE-OBS 2016-06-12T16:27:29.5

UVOT Finding Chart