01234567891050.0

3:48:40.0

30.0

20.0

54:00.0

53:00.0

65:52:00.0

51:00.0

50:30.0

RA (J2000)

Dec (J2000)

OBSID 00664078000 / DATE-OBS 2015-11-18T03:11:27.2

UVOT Finding Chart