051015202530354006.0

20:24:00.0

23:54.0

30.0

53:00.0

33:52:00.0

51:00.0

50:30.0

RA (J2000)

Dec (J2000)

OBSID 00644596000 / DATE-OBS 2015-06-18T09:55:13.7

UVOT Finding Chart