02468101228.0

24.0

14:46:20.0

19:00.0

30.0

12:18:00.0

17:00.0

16:00.0

RA (J2000)

Dec (J2000)

OBSID 00638808000 / DATE-OBS 2015-04-23T06:29:31.8

UVOT Finding Chart