05E-17

1E-16

1.5E-16

2E-16

2.5E-16

3E-16

3.5E-16

4E-16

4.5E-16

5E-16

9:18:00.0

56.0

52.0

17:48.0

24:30.0

25:00.0

30.0

-22:26:00.0

27:00.0

RA (J2000)

Dec (J2000)

OBSID 00633173000 / DATE-OBS 2015-03-01T18:04:45.4

UVOT Finding Chart