0246810121404.0

2:37:00.0

56.0

36:52.0

07:30.0

08:00.0

30.0

09:00.0

-33:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00629547000 / DATE-OBS 2015-02-02T23:11:48.5

UVOT Finding Chart