02468101214161824.0

0:47:20.0

16.0

12.0

35:30.0

36:00.0

30.0

-37:37:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00629302000 / DATE-OBS 2015-02-01T13:48:45.8

UVOT Finding Chart