051015202530354058.0

54.0

12:36:50.0

46.0

21:00.0

30.0

7:20:00.0

19:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 00628458000 / DATE-OBS 2015-01-27T11:38:14.0

UVOT Finding Chart