05101520253042.0

38.0

34.0

8:46:30.0

26.0

52:30.0

-48:53:00.0

30.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 00623368000 / DATE-OBS 2015-01-03T20:17:07.3

UVOT Finding Chart