024681012141618205:07:00.0

56.0

06:52.0

30.0

51:00.0

12:50:00.0

49:00.0

48:30.0

RA (J2000)

Dec (J2000)

OBSID 00614390000 / DATE-OBS 2014-10-04T23:22:12.0

UVOT Finding Chart