010203040506040.0

10:46:30.0

20.0

32:00.0

30.0

-60:33:00.0

34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00614193000 / DATE-OBS 2014-10-02T04:59:29.5

UVOT Finding Chart