01234567891042.0

38.0

34.0

18:04:30.0

-1:20:00.0

30.0

21:00.0

22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00609885000 / DATE-OBS 2014-08-18T18:49:54.6

UVOT Finding Chart