02468101214161812.0

06.0

8:29:00.0

28:54.0

30.0

12:00.0

11:00.0

58:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00609736000 / DATE-OBS 2014-08-17T07:07:26.8

UVOT Finding Chart