02468101250.0

3:45:40.0

30.0

31:00.0

-66:32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 00607742000 / DATE-OBS 2014-07-30T19:58:22.3

UVOT Finding Chart