0.51.52.5313:31:50.0

46.0

42.0

18:00.0

30.0

29:17:00.0

16:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00596958000 / DATE-OBS 2014-04-23T21:12:03.8

UVOT Finding Chart