05101520253035404506.0

8:28:00.0

54.0

27:48.0

16:00.0

30.0

15:00.0

46:14:00.0

13:00.0

12:30.0

RA (J2000)

Dec (J2000)

OBSID 00596426000 / DATE-OBS 2014-04-19T04:08:39.6

UVOT Finding Chart