05101520253035404510.0

17:48:00.0

50.0

47:40.0

41:00.0

30.0

-64:42:00.0

43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00593433000 / DATE-OBS 2014-03-27T04:59:34.5

UVOT Finding Chart