0246810121420.0

23:48:00.0

40.0

47:20.0

52:30.0

53:00.0

30.0

-79:54:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00592916000 / DATE-OBS 2014-03-23T10:28:42.8

UVOT Finding Chart