02040608010012014016018:47:30.0

26.0

22.0

08:30.0

09:00.0

30.0

-11:10:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00592544000 / DATE-OBS 2014-03-20T02:14:25.2

UVOT Finding Chart