01020304050607050.0

14:21:40.0

30.0

35:00.0

-61:36:00.0

37:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00584155000 / DATE-OBS 2014-01-18T08:40:60.0

UVOT Finding Chart