051015202530354045505540.0

21:40:30.0

20.0

46:00.0

30.0

58:45:00.0

44:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00583338000 / DATE-OBS 2014-01-08T17:20:12.1

UVOT Finding Chart