-60-40-20020406042.0

38.0

34.0

19:49:30.0

14:00.0

30.0

13:00.0

30:12:00.0

11:00.0

10:30.0

RA (J2000)

Dec (J2000)

OBSID 00583105000 / DATE-OBS 2014-01-06T23:37:02.6

UVOT Finding Chart