01020304050607012.0

06.0

16:34:00.0

33:54.0

22:00.0

30.0

-47:23:00.0

24:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00521085000 / DATE-OBS 2012-04-28T16:04:58.8

UVOT Finding Chart