02468101210.0

15:39:00.0

50.0

38:40.0

17:00.0

30.0

18:00.0

19:00.0

-66:20:00.0

RA (J2000)

Dec (J2000)

OBSID 00503926000 / DATE-OBS 2011-09-24T09:08:02.4

UVOT Finding Chart