05101520253019:26:00.0

50.0

40.0

25:30.0

30.0

44:00.0

67:43:00.0

42:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 00451165000 / DATE-OBS 2011-04-11T19:36:33.8

UVOT Finding Chart