4:23:30.0

4:22:30.0

21:30.0

-57:00:00.0

05:00.0

10:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00419554000 / DATE-OBS 2010-04-15T23:07:26.1

UVOT Finding Chart