14:00.0

12:00.0

1:10:00.0

-75:55:00.0

-76:00:00.0

05:00.0

10:00.0

RA (J2000)

Dec (J2000)

OBSID 00324744000 / DATE-OBS 2008-09-15T01:07:24.5

UVOT Finding Chart