2:28:30.0

2:27:30.0

26:30.0

25:00.0

-55:30:00.0

35:00.0

40:00.0

RA (J2000)

Dec (J2000)

OBSID 00286809000 / DATE-OBS 2007-08-02T07:11:34.7

UVOT Finding Chart