12:06:16.0

12:06:10.0

12:06:04.0

40:10:00.0

30.0

09:00.0

08:00.0

07:30.0

RA (J2000)

Dec (J2000)

OBSID 00275119000 / DATE-OBS 2007-04-12T01:28:14.9

UVOT Finding Chart