55.0

1:06:50.0

45.0

40.0

21:30.0

22:00.0

30.0

-41:23:00.0

24:00.0

RA (J2000)

Dec (J2000)

OBSID 00221627000 / DATE-OBS 2006-07-28T22:39:05.4

UVOT Finding Chart