0123456742.0

38.0

34.0

3:40:30.0

25:30.0

26:00.0

30.0

-22:27:00.0

28:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 01319125000 / DATE-OBS 2025-05-30T19:03:49.2

UVOT Finding Chart