0246810121422:18:20.0

16.0

12.0

06:30.0

07:00.0

30.0

-9:08:00.0

09:00.0

RA (J2000)

Dec (J2000)

OBSID 01314210000 / DATE-OBS 2025-05-16T14:41:24.9

UVOT Finding Chart