024681012141618202236.0

17:58:30.0

24.0

19:30.0

-40:20:00.0

30.0

21:00.0

22:00.0

RA (J2000)

Dec (J2000)

OBSID 01310284000 / DATE-OBS 2025-05-04T23:28:50.4

UVOT Finding Chart