010203040506070809054.0

5:23:50.0

46.0

42.0

05:00.0

30.0

33:04:00.0

03:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 01299967000 / DATE-OBS 2025-03-31T04:52:51.0

UVOT Finding Chart