02040608010012038.0

34.0

4:45:30.0

26.0

22.0

30.0

49:00.0

43:48:00.0

47:00.0

RA (J2000)

Dec (J2000)

OBSID 01299965000 / DATE-OBS 2025-03-31T04:25:36.0

UVOT Finding Chart