2600

2800

3000

3200

3400

3600

3800

4000

4200

20.0

7:07:00.0

40.0

06:20.0

20:00.0

18:00.0

16:00.0

14:00.0

12:00.0

7:10:00.0

08:00.0

06:00.0

04:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 01297832000 / DATE-OBS 2025-03-22T16:11:38.9

UVOT Finding Chart