8E-16

6E-16

4E-16

2E-16

0-2E-16

-4E-16

-6E-16

-8E-16

58.0

54.0

3:57:50.0

46.0

07:00.0

30.0

08:00.0

09:00.0

-15:10:00.0

RA (J2000)

Dec (J2000)

OBSID 01290305000 / DATE-OBS 2025-02-21T03:37:19.6

UVOT Finding Chart