05101520253024.0

1:04:20.0

16.0

08:30.0

09:00.0

30.0

-12:10:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 01287821000 / DATE-OBS 2025-02-07T01:18:35.8

UVOT Finding Chart