0246810121416182048.0

44.0

13:14:40.0

30.0

03:00.0

02:00.0

01:00.0

5:00:00.0

RA (J2000)

Dec (J2000)

OBSID 01285812000 / DATE-OBS 2025-01-29T05:05:28.3

UVOT Finding Chart