012345678948.0

44.0

15:25:40.0

36.0

29:30.0

-0:30:00.0

30.0

31:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 01285677000 / DATE-OBS 2025-01-28T16:28:23.4

UVOT Finding Chart