01234524.0

11:06:20.0

16.0

05:30.0

06:00.0

30.0

-15:07:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 01281241000 / DATE-OBS 2025-01-14T07:38:49.0

UVOT Finding Chart