01234528.0

24.0

13:25:20.0

16.0

12.0

30.0

38:00.0

25:37:00.0

36:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 01280056000 / DATE-OBS 2025-01-08T10:28:15.9

UVOT Finding Chart