012345642.0

38.0

34.0

3:38:30.0

45:00.0

30.0

-33:46:00.0

47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 01278865000 / DATE-OBS 2025-01-03T15:50:06.4

UVOT Finding Chart