0123456718.0

14.0

2:28:10.0

30.0

19:10:00.0

09:00.0

08:00.0

07:30.0

RA (J2000)

Dec (J2000)

OBSID 01278305000 / DATE-OBS 2025-01-01T13:28:15.6

UVOT Finding Chart