024681012141618202222:59:20.0

17.0

14.0

11.0

37:00.0

30.0

18:36:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 01277277000 / DATE-OBS 2024-12-27T04:12:17.8

UVOT Finding Chart