024681012141612.0

08.0

04.0

5:47:00.0

38:30.0

39:00.0

30.0

-0:40:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 01267921000 / DATE-OBS 2024-11-15T13:20:53.5

UVOT Finding Chart