2000

2500

3000

3500

4000

30.0

3:23:00.0

22:30.0

34:00.0

32:00.0

30:00.0

28:00.0

26:00.0

24:00.0

22:00.0

34:20:00.0

18:00.0

16:00.0

RA (J2000)

Dec (J2000)

OBSID 01263840000 / DATE-OBS 2024-10-30T18:37:36.1

UVOT Finding Chart