02468101215:00.0

22:14:00.0

36:00.0

30.0

83:35:00.0

34:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 01262165000 / DATE-OBS 2024-10-25T01:51:59.7

UVOT Finding Chart